Iris data: Size & elongation

species Setosa Versicolor Virginica

Size: log (PetalLen*PetalWid)

2

3

4

5

6

7

8

Elongation: log (PetalLen/PetalWid)

0.5 1.0 1.5 2.0 2.5 3.0