Data on physical fitness

Oxygen consumption

30

40

50

60

70

Runtime

8 9 10 11 12 13 14 15

Fitness data: Errors of measurement in X

30

40

50

60

70

Runtime + N(0,1)

8 9 10 11 12 13 14 Fitness data: Errors of measurement in X

30

40

50

60

70

Runtime + N(0,2^2)

5 6 7 8 9 10 11 12 13 14 15 16 17 18

Fitness data: Errors of measurement in X

30

40

50

60

70

Runtime + N(0,5^2)

-1 0 1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16 17 18