Original data

fuel/person

300

400

500

600

700

800

900

1000

popdens

-4 -3 -2 -1 0 1 2

Error in X: 0.5 std

fuel/person

300

400

500

600

700

800

900

1000

popden1

-4 -3 -2 -1 0 1 2

Error in X: 1.0 std

300

400

500

600

700

800

900

1000

popden2

-4 -3 -2 -1 0 1 2

Error in X: 1.5 std

300

400

500

600

700

800

900

1000

popden3

-4 -3 -2 -1 0 1 2

Error in X: 2.0 std

300

400

500

600

700

800

900

1000

popden4

-4 -3 -2 -1 0 1 2