Simple Regression: Bootstrap samples

-60 -45 -30 -15 0 15 30 45 60 75 90 0

10

20

30

40

50

Percent

Mean 12.15089 Std Deviation 16.5843 5th Percentile -13.0349 95th Percentile 34.53772

Intercept

Simple Regression: Bootstrap samples

-1 -0.5 0 0.5 1 1.5 2 2.5 3 3.5 4 0

5

10

15

20

25

30

35

40

Percent

Mean 1.271683 Std Deviation 0.565591 5th Percentile 0.501681 95th Percentile 2.196527

Perstest Slope

Simple Regression: Bootstrap samples

-60 -45 -30 -15 0 15 30 45 60 75 90 0

10

20

30

40

50

Percent

Mean 12.15089 Std Deviation 16.5843 5th Percentile -13.0349 95th Percentile 34.53772

Intercept

Simple Regression: Bootstrap samples

-1 -0.5 0 0.5 1 1.5 2 2.5 3 3.5 4 0

5

10

15

20

25

30

35

40

Percent

Mean 1.271683 Std Deviation 0.565591 5th Percentile 0.501681 95th Percentile 2.196527

Perstest Slope