Radiation=1

Air temperature 6.0 7.5 9.0

Fitted Vitamin B12

30 50 70 90 110 130 150

Soil moisture

0.0 0.1 0.2 0.3 0.4 0.5

Radiation=3

Air temperature 6.0 7.5 9.0 30 50 70 90 110 130 150

Soil moisture

0.0 0.1 0.2 0.3 0.4 0.5